---
title: "Frontend Demo"
description: "Run the Vite + React UI for testing the daemon."
---

The demo frontend lives at `frontend/packages/web`.

## Run locally

```bash
pnpm install
pnpm --filter @sandbox-agent/web dev
```

The UI expects:

- Endpoint (e.g. `http://127.0.0.1:2468`)
- Optional token

If you see CORS errors, enable CORS on the daemon with `--cors-allow-origin` and related flags.
